/*
 Navicat Premium Dump SQL

 Source Server         : 智能控制平台
 Source Server Type    : PostgreSQL
 Source Server Version : 150013 (150013)
 Source Host           : 10.10.10.9:5432
 Source Catalog        : ktor2
 Source Schema         : public

 Target Server Type    : PostgreSQL
 Target Server Version : 150013 (150013)
 File Encoding         : 65001

 Date: 22/08/2025 10:13:04
*/


-- ----------------------------
-- Table structure for video_analytics_details
-- ----------------------------
DROP TABLE IF EXISTS "public"."video_analytics_details";
CREATE TABLE "public"."video_analytics_details" (
  "id" uuid NOT NULL,
  "v_id" uuid,
  "time_stamp" int4 NOT NULL,
  "total_people" int4,
  "total_people_masked" int4,
  "action" varchar(50) COLLATE "pg_catalog"."default"
)
;

-- ----------------------------
-- Records of video_analytics_details
-- ----------------------------
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1378', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 1, 0, 0, '--');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1379', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 11, 1, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1380', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 23, 2, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1381', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 33, 1, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1382', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 49, 2, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1383', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 59, 1, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1384', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 69, 2, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1385', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 79, 1, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1386', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 89, 3, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1387', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 101, 4, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1388', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 111, 3, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1389', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 123, 2, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1390', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 133, 3, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1391', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 143, 2, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1392', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 153, 3, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1393', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 163, 2, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1394', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 173, 1, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1395', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 183, 3, 1, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1396', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 193, 1, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1397', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 203, 2, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1398', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 213, 1, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1399', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 223, 2, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1400', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 233, 1, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1401', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 243, 2, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1402', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 253, 1, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1403', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 276, 0, 0, '--');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1404', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 287, 1, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1405', '1a16b6ce-a901-b8c5-607b-eebd33b0544e', 297, 2, 0, 'disinfection');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1406', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 1, 0, 0, '--');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1407', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 12, 1, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1408', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 22, 2, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1409', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 34, 3, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1410', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 44, 2, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1411', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 54, 3, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1412', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 65, 2, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1413', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 75, 3, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1414', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 85, 4, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1415', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 95, 3, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1416', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 106, 2, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1417', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 116, 3, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1418', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 126, 4, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1419', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 136, 3, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1420', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 146, 2, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1421', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 156, 3, 1, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1422', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 166, 3, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1423', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 177, 2, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1424', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 187, 3, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1425', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 197, 2, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1426', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 207, 1, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1427', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 217, 3, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1428', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 228, 4, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1429', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 238, 2, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1430', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 248, 3, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1431', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 259, 2, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1432', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 269, 3, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1433', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 279, 5, 0, 'feed');
INSERT INTO "public"."video_analytics_details" VALUES ('38fcd3c0-0a61-731f-6dbe-fda51dbf1434', 'cccd78df-eb31-c502-3b45-a00460d43c7d', 289, 4, 0, 'feed');

-- ----------------------------
-- Primary Key structure for table video_analytics_details
-- ----------------------------
ALTER TABLE "public"."video_analytics_details" ADD CONSTRAINT "video_analytics_details_pkey" PRIMARY KEY ("id");
